0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 0 50 100 Discreet

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 0 50 100 Trinary

0.8 1 1.2 0 100 200 Binary

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 0 50 100 Exp

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 0 50 100 Normal

0.6 0.7 0.8 0.9 1 1.1 1.2 0 50 100 Uniform

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 0 50 100 2Gauss