0 0.5 1 0 100 200 300

-100 0 100 0 200 400 600

0 0.5 1 0 200 400 600

2 4 6 8 10 0 100 200 300

2 4 6 8 10 0 100 200 300

2 4 6 8 10 0 200 400 600

0 0.5 1 0 100 200 300

-2 0 2 0 100 200 300

0 0.5 1 0 200 400 600

0.2 0.4 0.6 0.8 0 100 200 300

0 0.5 1 0 100 200 300

0.2 0.4 0.6 0.8 0 100 200 300